-- fusentest.fs_standard_logo definition

CREATE TABLE `fs_standard_logo` (
    `id` int(10) NOT NULL AUTO_INCREMENT COMMENT 'ID',
    `name` varchar(20) CHARACTER SET utf8mb4 NOT NULL COMMENT 'logo名称',
    `image` varchar(255) CHARACTER SET utf8mb4 NOT NULL COMMENT '图片地址',
    `ctime` int(10) NOT NULL DEFAULT '0' COMMENT '添加时间',
    `status` tinyint(1) NOT NULL DEFAULT '1' COMMENT '状态 1正常 0删除',
    PRIMARY KEY (`id`)
) ENGINE=MyISAM AUTO_INCREMENT=8 DEFAULT CHARSET=utf8 COMMENT='标准logo';